---
title: Heel circumference
---

The **heel circumference** measurement is the narrowest measurement a trouser leg can be so you can still get in to it.

To measure your heel circumference, stretch your foot forward, and run the tape measure around your foot at the widest part of your heel.

<MeasurementImage />
