---
title: Neck ratio
---

Controls the size of the neck opening relative to the bib size. The bib size is determined by [head size](/docs/designs/bob/options#headsize), this option controls how much to reduce the head size by to determine the circumference and width of the neck opening.

- Increase the percentage to widen the neck opening.
- Decrease the percentage to constrict the neck opening.
