---
title: Waist back
---

The **waist back** measurement is the back part of your waist circumference.

To measure your **waist back**, wrap the tape measure around the narrowest part of your waist, making sure to keep it horizontal.
Then, measure the length from one side over your back to the other.

<MeasurementImage />
