---
title: Upper leg circumference
---

The **upper leg circumference** is the measurement around your leg, near the top of your leg.

You should measure this a bit below your crotch, refer to the illustration for guidance.
Make sure to keep the tape measure horizontal to the floor as you measure the circumference of your leg.

<Tip>

##### Be mindful of the vertical location of this measurement

This measurements is also used as **a vertical reference** to determine the vertical space in which to draft the seat/crotch of trousers. As such, the vertical location of this measurement is important.

</Tip>
<MeasieImage />
