---
title: Bust front
---

The **bust front** is the front part of your chest circumference.

To measure your bust front, run the tape measure horizontally across the fullest part of your chest,
starting at the side (seam) on one side, across your breasts to the side (seam) on the other side.
<MeasieImage />
