---
title: Cross seam
---

The **cross seam** is measured from the waist line at the front through your legs to the back.

To measure your **cross seam** tie a string around your waist. Then, measure down from the
center front of your waist going through your legs back up to the back until you meet the string
at your waist.
<MeasieImage />
