---
title: Knee circumference
---

The **knee circumference** is the measurement around your knee.

To measure your **knee circumference**, wrap the tape measure around your knee.
Make sure to keep the tape measure horizontal to the floor as you measure the circumference of your knee.
<MeasieImage />
