---
title: Underbust
---

The **underbust** measurement is the circumference of your chest without taking your breasts into account.

To measure your **underbust**, wrap the tape measure around your chest just below your breasts, where your bra band sits.

If you don’t have breasts, this measurement does not apply to you. Just use your chest circumference.
<MeasieImage />
