---
title: utils.goldenRatio
---

The `utils.goldenRatio` value holds `1.618034`.
This value approximates **φ** which is also known
as [the golden ratio](https://en.wikipedia.org/wiki/Golden_ratio).

## Signature

```js
Number utils.goldenRatio
```
