---
title: Chest circumference
---

The **chest circumference** measurement wraps around the fullest part of your chest.

To measure your chest circumference, wrap the tape measure around your chest at the fullest part.
Make sure to keep the tape measure horizontal (parallel to the floor).

<MeasurementImage />
