---
title: 'Collar stand width'
---

![Collarstand width](collarstandwidth.svg)

The height of your collar stand.

:::note

This is the main parameter to change the overall height of your collar. This defaults to a modern relatively slim collar, but you can crank it up all the way to Karl Lagerfeld style.

:::
